/*
 Navicat Premium Data Transfer

 Source Server         : room
 Source Server Type    : MySQL
 Source Server Version : 80029
 Source Host           : 192.168.3.233:3306
 Source Schema         : joylink

 Target Server Type    : MySQL
 Target Server Version : 80029
 File Encoding         : 65001

 Date: 06/12/2022 09:53:18
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for rts_iscs_model_data
-- ----------------------------
DROP TABLE IF EXISTS `rts_iscs_model_data`;
CREATE TABLE `rts_iscs_model_data`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'iscs数据模型id',
  `system` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'iscs一级系统(如FAS、PIS、AFC等)',
  `view` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'iscs二级视图',
  `place` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '场所(车站、变电所、停车场等)',
  `data` blob NULL COMMENT '场所整个所有的模型的数据',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_time` datetime NULL DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
