DROP TABLE IF EXISTS `project_server`;
CREATE TABLE `project_server` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `project` varchar(32) NOT NULL COMMENT '项目编码',
  `domain_name` varchar(255) NOT NULL COMMENT '域名',
  `create_user_id` bigint(20) NOT NULL,
  `create_time` datetime NOT NULL ON UPDATE CURRENT_TIMESTAMP,
  `update_user_id` bigint(20) DEFAULT NULL,
  `update_time` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`),
  UNIQUE KEY `project_server_project_1` (`project`)
) ENGINE=InnoDB AUTO_INCREMENT=3 DEFAULT CHARSET=utf8 COMMENT='项目服务器域名表';