SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for model_2d_draft
-- ----------------------------
DROP TABLE IF EXISTS `model_2d_draft`;
CREATE TABLE `model_2d_draft` (
  `id` bigint(20) NOT NULL,
  `code` varchar(32) NOT NULL COMMENT '编号',
  `name` varchar(32) NOT NULL COMMENT '模型名称',
  `json_data` mediumtext COMMENT '模型数据',
  `create_user_id` bigint(20) NOT NULL,
  `create_time` datetime NOT NULL ON UPDATE CURRENT_TIMESTAMP,
  `update_user_id` bigint(20) DEFAULT NULL,
  `update_time` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Table structure for model_2d
-- ----------------------------
DROP TABLE IF EXISTS `model_2d`;
CREATE TABLE `model_2d` (
  `id` bigint(20) NOT NULL,
  `code` varchar(32) NOT NULL COMMENT '编号（唯一）',
  `name` varchar(32) NOT NULL COMMENT '模型名称',
  `json_data` mediumtext NOT NULL COMMENT '模型数据',
  `version` int(11) NOT NULL COMMENT '版本',
  `state` varchar(2) NOT NULL COMMENT '状态',
  `create_user_id` bigint(20) NOT NULL,
  `create_time` datetime NOT NULL ON UPDATE CURRENT_TIMESTAMP,
  `update_user_id` bigint(20) DEFAULT NULL,
  `update_time` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;