SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for circuitry_draft
-- ----------------------------
DROP TABLE IF EXISTS `circuitry_draft`;
CREATE TABLE `circuitry_draft` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `name` varchar(32) NOT NULL COMMENT '名称',
  `draw_data` mediumtext COMMENT '绘图数据',
  `create_user_id` bigint(20) NOT NULL,
  `create_time` datetime NOT NULL ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=4 DEFAULT CHARSET=utf8;
